(GeV) E 0 5 10 15 20 25 30 35 40 45 50

RF

1−10

1

10

210

310

410

EMC-L0/MB 4.1 < E < 30.0 1.1±

67.0 EMC-L1/EMC-L0 12.5 < E < 50.0 4.0±

222.5 PHOS-L0/MB 6.0 < E < 24.0^310× 1.5)±

(12.4

ALICE performance

= 8 TeV s pp,

Fit range (GeV) Trigger rejection